DROP POLICY IF EXISTS login_events_isolation ON login_events;
ALTER TABLE login_events NO FORCE ROW LEVEL SECURITY;
ALTER TABLE login_events DISABLE ROW LEVEL SECURITY;
DROP TABLE IF EXISTS login_events;
